--
-- Title:      Change Oracle LONG RAW columns to BLOB
-- Database:   Generic
-- Since:      V2.2 Schema 92
-- Author:     Derek Hulley
--
-- Please contact support@alfresco.com if you need assistance with the upgrade.
--
-- No effect on non-Oracle DBs

--
-- Record script finish
--
DELETE FROM alf_applied_patch WHERE id = 'patch.db-V2.2-OrclBLOB';
INSERT INTO alf_applied_patch
  (id, description, fixes_from_schema, fixes_to_schema, applied_to_schema, target_schema, applied_on_date, applied_to_server, was_executed, succeeded, report)
  VALUES
  (
    'patch.db-V2.2-OrclBLOB', 'Did nothing for non-Oracle DB.',
    0, 91, -1, 92, null, 'UNKOWN', 1, 1, 'Script completed'
  );